\begin{figure}[!htb]
    \centering
    \begin{minipage}[b]{1\linewidth}
    \centering
    \subfigure[\census]{
    \includegraphics[width=0.49\linewidth]{ACSAC/figures/egd/census/census_egd_utility.pdf}
    }%
    \subfigure[\compas]{
    \includegraphics[width=0.49\linewidth]{ACSAC/figures/egd/compas/compas_egd_utility.pdf}
    }\\
    \subfigure[\meps]{
    \includegraphics[width=0.49\linewidth]{ACSAC/figures/egd/meps/meps_egd_utility.pdf}
    }%
    \subfigure[\lfw]{
    \includegraphics[width=0.49\linewidth]{ACSAC/figures/egd/lfw/lfw_egd_utility.pdf}
    }
    \end{minipage}
    \caption{Utility degradation for \egd: We observe a statistically significant drop in $\targetmodel$'s accuracy on using \egddp which matches the observation from prior work~\cite{reductions}.}
    \label{fig:utilityEGD}
\end{figure}
